                                  MAIN MENU
                       [K] Customize Program Operation

    Use this Selections to:

    Enter your Company Name to appear on the Main Menu screen and in the
    headings of printed reports.

    Enter up to 16 Custom room descriptions.  If you do not require all
    16 descriptions, simply press [ENTER] at the prompts.
    WARNING!  These descriptions should not be changed after they have
    been set up.  If they are, information in the Master files may not
    match the new descriptions.







 